-- Generated by BladeSmith 3.50.TC1, DO NOT MODIFY --

execute procedure ifx_allow_newline('t');

insert into sysbldmodules
	(bld_id, bld_server_type, bld_inst_state)
values
(
	"%SYSBLDNAME%",
	"any", 0
);

insert into sysbldscripts
	(bld_id, blocale_id, bscr_type, bscr_sequence, bscr_sql_script)
values
(
	"%SYSBLDNAME%",
	"any",
	4, 1,
	"objects.sql"
);

insert into sysbldupgrades
	(bld_id, bld_upgrade_like)
values
(
	"%SYSBLDNAME%",
	"LLD.%"
);

insert into sysbldinterfaces
	(bldi_id, bldi_name, bldi_desc)
values
(
	"ILLD1",
	"ILLD1",
	"Lob Locator Datablade interface for 1.20.UC1B1 release."
);

insert into sysbldifacprovided
	(bldi_id, bld_id)
values
(
	"ILLD1",
	"%SYSBLDNAME%"
);

insert into sysbldinterfaces
	(bldi_id, bldi_name, bldi_desc)
values
(
	"ILLD2",
	"ILLD2",
	"Lob Locator Datablade interface for 1.20.UC2 release"
);

insert into sysbldifacprovided
	(bldi_id, bld_id)
values
(
	"ILLD2",
	"%SYSBLDNAME%"
);

